0 20 40 60 80 100 120 140 160 -1

0

1 117

NCCF

0 20 40 60 80 100 120 140 160 -1

0

1

ACF

0 20 40 60 80 100 120 140 160 0 0.5 1 1.5

Cepstral coef.

0 20 40 60 80 100 120 140 160

-0.5 0 0.5 1

---> samples

ACF of LPC error sig.